Crypto Economy’s Market Cap Slides Below $800 Billion for the First Time Since December 2020

The global cryptocurrency market capitalization has dropped below the $800 billion region for the first time in 691 days or since December 30, 2020. Bitcoin has dipped below the $16K region dropping 5.12% over the past 24 hours, and the second leading crypto asset ethereum shed 7.61% on Monday, dropping below the $1,100 range. Crypto […]

Go to Source

Powered by WPeMatico