Moody’s Warns of Potential Financial Disruption Spillover Beyond US Banking Sector

Roughly ten days ago, the credit agency Moody’s Investors Service downgraded the U.S. banking sector from “stable” to “negative.” In a recent update on Thursday, the company stated that there is still a risk to the U.S. economy. The managing director of credit strategy at Moody’s explained that the country “will be unable to curtail […]

Go to Source

Powered by WPeMatico